                                                                         0.9 0.91 0.92 0.93 0.94 0.95 0.96 0.97 0.98 0.99 1

                                           -0.25

                                                -0.2

                                           -0.15

                                                -0.1

                                           -0.05

                                                          0

rho

Constraint 2

Constraint 2